ma-interface-consistent2^{11,40}

ma-interface-consistent2(es;I) ≡_{def} ∀i:Id.

(i ∈ ma-interface-locs(I)) ⇒ (∀k:{k:Knd| ↑hasloc(k;i)} .

(k ∈ ma-interface-dom(I;i)) ⇒ (∀e@i. (kind(e) = k) ⇒ (valtype(e) ⊆r ma-interface-valtype(I;i;k)) & (∀x:Id. vartype(i;x) ⊆r ma-interface-ds(I;i)(x)?Top)))

clarification:

ma-interface-consistent2(es;I) ≡_{def} ∀i:Id.

(i ∈ ma-interface-locs(I) ∈ Id) ⇒ (∀k:{k:Knd| ↑hasloc(k;i)} .

(k ∈ ma-interface-dom(I;i) ∈ Knd) ⇒ (alle-at(es;i;e.(es-kind(es; e) = k ∈ Knd)

⇒ (es-valtype(es; e) ⊆r ma-interface-valtype(I;i;k))) & (∀x:Id. es-vartype(es; i; x) ⊆r fpf-cap(ma-interface-ds(I;i);IdDeq;x;Top))))

http://www.nuprl.org/FDLcontent/p0 963683 /p55 257643 {ma-interface-consistent2}.html